<script setup lang="ts">
import AOS from "aos"

onMounted(() => {
  AOS.init({
    easing: "ease-out",
    duration: 800,
  })
})
</script>

<template>
  <NuxtLayout>
    <NuxtPage />
  </NuxtLayout>
</template>
